-- Force schema cache refresh by selecting from the table
SELECT * FROM platform_settings LIMIT 1;

-- Verify the column exists
SELECT column_name, data_type, is_nullable
FROM information_schema.columns 
WHERE table_name = 'platform_settings' 
AND column_name = 'google_service_account_json';

-- Update the table to trigger cache refresh (safe operation, just sets same value)
UPDATE platform_settings SET id = id WHERE 1=1 LIMIT 1;
